1767232157617
890,0.64.8
620,0.64.8
5668,0.64.8
7283,0.64.8
8001,0.64.8
6245,0.64.8
13133,0.64.8
18436,0.64.8
7403,0.64.8
9180,0.64.8
5772,0.64.8
13531,0.64.8
17661,0.64.8
